= Power Profiler - Firmware

Logiciel embarqué pour le Power Profiler (https://git.leserveurdansmongrenier.uk/leo/power-profiler-pcb[PCB], https://git.leserveurdansmongrenier.uk/leo/Power-profiler-client[Client])

== Services

[cols=6] 
|===
.2+h|Service
.2+h|Nom
.2+h|UUID
3+h|Charactéristiques
h|Nom
h|UUID
h|Descripteurs

|Mesures
|Courant calculé
|0x1878
|Courant electrique
|0x2AEE
|char_pres_format


.3+|Mesures
.3+|Courants
.3+|0x1878

|Courant electrique
|0x2AEE
|char_pres_format
Source gain (X1)

|Courant electrique
|0x2AEE
|char_pres_format
Source gain (X10)

|Courant electrique
|0x2AEE
|char_pres_format
Source gain (X100)


.3+|Mesures
.3+|Voltages bruts
.3+|0x1878

|Voltage
|0x2B18
|char_pres_format
Source gain (X1)

|Voltage
|0x2B18
|char_pres_format
Source gain (X10)

|Voltage
|0x2B18
|char_pres_format
Source gain (X100)


.2+|Plage de mesure
.2+|Plage de mesure
.2+|0x1880

|Auto-range
|0x2C15
|char_pres_format

|Plage actuelle
|0x2AEF
|char_pres_format


.4+|Configuration
.4+|Configuration
.4+|0x1879

|Delai de rafraichissement
|0x2C12
|char_pres_format

|Calibration des offsets au zero
|0x2C13
|N/A

|Reset des offsets
|0x2C16
|N/A

|Nombre de mesures pour la calibration
|0x2C14
|char_pres_format
|===